0 5000

10000

15000 49.5 < p < 50.0 MeV/c

0 5000

10000

15000 39.5 < p < 40.0 MeV/c 0

0 5000

10000

15000 29.5 < p < 30.0 MeV/c 0

zθ cos

-1 -0.5 0 0.5 1 0 5000

10000

15000 19.5 < p < 20.0 MeV/c Data Fit

0

Yield (events)