Asymmetry

-0.2 0 0.2 0.4 0.6 0.8 | < 0.84θ 0.50 < |cos (a)

Asymmetry

-0.2 0 0.2 0.4 0.6 0.8 Data within fiducial (b)

Momentum (MeV/c)

10 15 20 25 30 35 40 45 50

Asymmetry Δ

-0.02 0 0.02 Data - Fit (c)