Change in Momentum (MeV/c)

-2 -1.5 -1 -0.5 0 0.5 1 1.5 2

Counts

0 100 200 300 400 Data MC pΔ

Change in Angle (radians)

-0.04 -0.02 0 0.02 0.04

Counts

50 100 150 200 Data MC θΔ