0 10 20 30 40 50

Yield (Events)

0

500

1000

1500

2000^210×

All events

In fiducial

| < 0.84 θ 0.70 < |cos (a)

Probability

0.99

0.995 1 1.005

| < 0.84 θ 0.7 < |cos (b) 0 σ (Data - Fit)/

-2 0 2 | < 0.84 θ 0.7 < |cos (c)

Probability

0.99

0.995 1 1.005

| < 0.7 θ 0.5 < |cos (d)

Momentum (MeV/c)

0 10 20 30 40 50 σ (Data - Fit)/

-2 0 2 | < 0.7 θ 0.5 < |cos (e)