0 1 2 3 4 5 6 7 0 0.5 1 1.5 2 2.5 3 3.5 4 4.5

time bin (7.25 ns per bin) counts/( μA sec)

0 1 2 3 4 5 6 7 0 0.5 1 1.5 2 2.5 3 3.5 4 4.5

time bin (7.25 ns per bin)

(a) Total Surface and cloud muon flux

(b) Position flux