)^2

(MeV/c 0 mass of X

0 5 10 15 20 25 30 35 40

Branching Ratio

-0.04

-0.02 0 0.02

0.04

0.06

-310×

)^2

(MeV/c 0 mass of X

40 45 50 55 60 65

Branching Ratio

-0.04

-0.02 0 0.02

0.04

0.06

-310×

)^2

(MeV/c 0 mass of X

66 68 70 72 74 76 78 80

Branching Ratio

-0.04

-0.02 0 0.02

0.04

0.06

-310×