TCAP

M12 width

Evt Type mu last plane mu UV

PACT

DkWinTime

N tracks ierror startstop charge pair matching mu-e vertex

Select: dplane to tgt

Selec: mu-e vertex

DkFitTimeCut

Fiducial

Done

Fraction of events before cut