Signal Momentum (MeV/c)

50 50.5 51 51.5 52 52.5 53

)^6 10 × Branching Ratio (

0 20 40 60 80 100 120 )^2

(in MeV/c 0 Mass of X 024 6 8 10 12 14 16 18 20 22 24 90% C.I., A = -1 90% C.I., A = 0 90% C.I., A = +1