Momentum of Signal (MeV/c)

15 20 25 30 35 40 45 50 55

)^4 10 × (ρΔ

90 91 92 93 94

Momentum of Signal (MeV/c)

15 20 25 30 35 40 45 50 55

)^4 10× (δΔ

96 97 98 99 100 101

Momentum of Signal (MeV/c)

15 20 25 30 35 40 45 50 55

)^4 10 × (ξΔ

63 64 65 66 67 68 69 70