-3

-2

-1

0

1

2

3

Momentum (MeV/c)

0 10 20 30 40 50 θ cos

-1 -0.8

-0.6

-0.4

-0.2 -0 0.2 0.4 0.6 0.8 1 σ Normalized Fit Residuals (data - MC)/σ

Normalized Fit Residuals (data - MC)/

θ cos -1 -0.8 -0.6 -0.4 -0.2 -0 0.2 0.4 0.6 0.8 1

Normalized Fit Residuals

-3

-2

-1

0

1

2

3

Momentum (MeV/c)

0 10 20 30 40 50

Normalized Fit Residuals

-3

-2

-1

0

1

2

3

Normalized Residual

-4 -3 -2 -1 0 1 2 3 4 0 10 20 30 40 50 60 70 80 90 sum84-9-1_sum584-1_2_21-1_michel.root htemp_{Entries 2444}

Mean -0.0009923 RMS 1.015

sum84-9-1_sum584-1_2_21-1_michel.root