Momentum [MeV]

0 10 20 30 40 50

)θ cos(

-1 -0.5 0 0.5 1 -25000

-20000

-15000

-10000

-5000 0 5000

Spectrum_Selected Entries 1.249405e+07 Mean x 35.9 Mean y -0.2347 RMS x 13.77 RMS y 0.62