)^2

(MeV/c 0 mass of X

15 20 25 30 35 40 45 50 55 p-values

-16 10 -15 10 -14 10 -13 10 -12 10 -11 10 -10 10 -910

-810

-710

-610

-510

-410

-310

-210

-110 1