θ 1/cos

1 1.2 1.4 1.6 1.8 2

Momentum change (MeV/c)

-0.01

-0.005 0 0.005

0.01

0.015

0.02

0.025

Change in the Momentum edge Between Data and MC

< 24.44 tot 20.37 < p < 28.51 tot 24.44 < p < 32.59 tot 28.51 < p < 36.66 tot 32.59 < p < 40.74 tot 36.66 < p < 44.81 tot 40.74 < p < 48.88 tot 44.81 < p < 52.96 tot 48.88 < p

totp

20 25 30 35 40 45 50 slope (MeV/c)

-0.012

-0.01

-0.008

-0.006

-0.004

-0.002

/ ndf

2χ 7.52 / 6

p0 0.001241 ± -0.003657

p1 0.002831 ± 0.008121 ± ±

totp

20 25 30 35 40 45 50 intercept (MeV/c)

0.006

0.008

0.01

0.012

0.014

0.016

0.018

0.02

0.022

0.024

/ ndf

2χ 7.504 / 6

p0 0.00188 ± 0.01229

p1 0.004249 ± 9.405e-05 ± ±