chi2slice

Entries 2.005894e+07 / ndf

2χ 20.13 / 8 p0 8.2± 333.7 p1 438± -2.723e+04 p2 11122±

8.902e+05

tot pΔ

-0.1 -0.05 0 0.05 0.1

2χ Calculated

0

2000

4000

6000

8000

10000

12000