edge W edge x-P cdf 1 - Gauss × Rate

× ^U sfcP x y =

Bkgd

× ^B sfcP x +

= 27.911 dof 2χ

= 29.79 (Fixed) sfc P 0.120 ± U = -1.931 0.0022 ± Rate = 1.1643 0.0003 ± = 29.7900

edge P 0.0002 ± = 0.0804

edge W B = 2.5 (Fixed) 7.39e-05 ± Bkgd = 2.4577e-02

= 0.6356 % p dp New B1NMR value for 29.6MeV/c : B1 = 878.18 G

29 29.2 29.4 29.6 29.8 30 30.2 30.4 30.6 0 0.2 0.4 0.6 0.8 1 1.2

run_50691_to_50705 W × x

x +

P ± ± ± P ± W

± p