Plane number

0 5 10 15 20 25 30 35 40 45

Pressure of minimal bulge

90 100 110 120 130 140 150 / ndf _2χ 8.906 / 27 Prob 0.9996 p0 1.864± 113

/ ndf

2χ 8.906 / 27