/ ndf

2χ 135 / 157 (0) μP 0.001±

1.002 (ns) σ 4623±

5.111e+04

Decay Time(ns)

2000 4000 6000 8000 μP

0.9

0.95

1

1.05

(t) fit to Gaussian μ 2004 Data P

/ ndf

2χ 136.9 / 157 (0) μP 0.001±

1.005 (1/ns) λ 2.83e-07 ± -1.55e-06

Decay Time(ns)

2000 4000 6000 8000 μP

0.9

0.95

1

1.05

±

(t) fit to Exponential μ 2004 Data P

/ ndf

2χ 105.2 / 123 (0) μP 0.001±

1.011 (ns) σ 3802±

5.205e+04

Decay Time(ns)

2000 4000 6000 8000 μP

0.9

0.95

1

1.05

(t) fit to Gaussian μ 2004 MC P

/ ndf

2χ 110.7 / 123 (0) μP 0.001± 1.013 (1/ns) λ 2.209e-07 ± -1.443e-06

Decay Time(ns)

2000 4000 6000 8000 μP

0.9

0.95

1

1.05

±

(t) fit to Exponential μ 2004 MC P