Decay Time(ns)

0 5000 10000

(t)μ P

-1

-0.95

-0.9

-0.85

-0.8

-0.75

(t)μ

Asymmetry Analysis P

Set1 (1.96T) Sum of 2002 Sets Set22 (2.04T)