Last z (cm) μ -10 -5 0 5 10

Count

1 10 210 310 410 Stop Centered Stop at 3/4 (a)

Count

1

210

410 PC5 Stop Selected Fraction in Metal vs Other:

= 0.067 5 mf = 0.933 5 of

(b)

1

210

10 Target Stop Selected = 0.945 6 mf = 0.055 6 of

Stopping z (cm) μ MC -1 -0.5 0 0.5 1 1

210

410 PC7 Stop Selected