dx -204

0 200 400 600 800 1000

1200

-0.1 0 0.1

ID Mean RMS 1001 0.1890E-02 0.6970E-02

dx -200

0 200 400 600 800 1000

1200

1400

-0.1 0 0.1

ID Mean RMS 1003 0.1900E-02 0.1147E-01

dx -183

0 200 400 600 800 1000

-0.1 0 0.1

ID Mean RMS 1007 0.2008E-02 0.1639E-01

dx -204

0 200 400 600 800 1000

1200

-0.1 0 0.1

ID Mean RMS 1001 0.1855E-02 0.6933E-02

dx -200

0 250 500 750 1000

1250

1500

1750

2000

-0.1 0 0.1

ID Mean RMS 1003 0.1884E-02 0.6919E-02

dx -183

0 250 500 750 1000

1250

1500

1750

2000

-0.1 0 0.1

ID Mean RMS 1007 0.1933E-02 0.6723E-02