dx -204

0 200 400 600 800 1000

1200

-0.1 0 0.1

ID Mean RMS 1001 0.1820E-02 0.6979E-02

dx -200

0 200 400 600 800 1000

1200

1400

-0.1 0 0.1

ID Mean RMS 1003 0.1826E-02 0.1055E-01

dx -183

0 200 400 600 800 1000

-0.1 0 0.1

ID Mean RMS 1007 0.1720E-02 0.1563E-01