H61255 Entries 27634 Mean 19.7 RMS 2.546

0 5 10 15 20 25 30 35 40 45 0

1000

2000

3000

4000

5000

TEC fired wires X H61256

Entries 27634 Mean 20.14 RMS 2.587

0 5 10 15 20 25 30 35 40 45 0

1000

2000

3000

4000

5000

6000

H61256

TEC fired wires Y

H61255 Entries 27091 Mean 15.81 RMS 2.752

0 5 10 15 20 25 30 35 40 45 0 500 1000

1500

2000

2500

3000

3500

4000

TEC fired wires X H61256

Entries 27091 Mean 15.82 RMS 2.548

0 5 10 15 20 25 30 35 40 45 0 500 1000

1500

2000

2500

3000

3500

4000

4500 H61256

TEC fired wires Y

H61255 Entries 28672 Mean 12.27 RMS 3.218

0 5 10 15 20 25 30 35 40 45 0 500 1000

1500

2000

2500

3000

3500

TEC fired wires X H61256

Entries 28672 Mean 14.08 RMS 2.836

0 5 10 15 20 25 30 35 40 45 0 500 1000

1500

2000

2500

3000

3500

4000

H61256

TEC fired wires Y

H61255 Entries 6494 Mean 8.362 RMS 2.749

0 5 10 15 20 25 30 35 40 45 0 100 200 300 400 500 600 700 800 900 TEC fired wires X H61256

Entries 6494 Mean 10.58 RMS 2.81

0 5 10 15 20 25 30 35 40 45 0 100 200 300 400 500 600 700 800 900 H61256

TEC fired wires Y