resolution (keV)

70 75 80 85 90 95 100 105 110 115

-4 10×ρΔ

-14 -12 -10 -8 -6 -4 -2 0 2 / ndf

2χ 0.02114 / 4 Prob 0.9999 offset 1.223±

-1.223 slope 0.07611 ± -0.2784 offsetpos 0± 74.7 ± vs resolution ρΔ

resolution (keV)

70 75 80 85 90 95 100 105 110 115

-4 10×δΔ

-15

-10

-5

0

5 / ndf

2χ 0.01015 / 4 Prob 1 offset 2.158± -1.314 slope 0.134± -0.2821 offsetpos 0± 74.7 vs resolution δΔ

resolution (keV)

70 75 80 85 90 95 100 105 110 115

-4 10×ξΔ

-5 0 5 10 15 20 25 30 35

/ ndf

2χ 0.01497 / 4 Prob 1 offset 2.667± 3.198 slope 0.1662± 0.6823 offsetpos 0± 74.7 vs resolution ξΔ