Z (cm)

-0.15 -0.1 -0.05 -0 0.05 0.1 0.15 0.2

UV(cm)

-0.2

-0.15

-0.1

-0.05 -0 0.05 0.1 0.15 0.2

0 100 200 300 400 500 600 700 Cell Occupancy, MC w/ Garfield STRs