θ 1/cos

-2 -1.5 -1 -0.5 0 0.5 1 1.5 2 edge (MeV/c

52.76

52.78

52.8

52.82

52.84

52.86

Standard Skewed

Raw Overlay

, Std vs Skewed θ Endpoint vs 1/cos

/ ndf

2χ 19.49 / 159 Prob 1 p0 3.622e-04 ± -1.371e-05

θ 1/cos

-2 -1.5 -1 -0.5 0 0.5 1 1.5 2

Differences

-0.01

-0.008

-0.006

-0.004

-0.002 0 0.002

0.004

0.006

0.008

0.01 ± (Skewed) - (Standard)