PC TOF (ns)

-100 -80 -60 -40 -20 0 20 40 60 80 100 counts

0 20 40

60 80

100 120 140

160 310 × PC TOF, US decays, gen335

PC TOF (ns)

-100 -80 -60 -40 -20 0 20 40 60 80 100 counts

0 20 40

60 80

100 120 140

160 310 × PC TOF, DS decays, gen335