θ cos 0.5 0.55 0.6 0.65 0.7 0.75 0.8 0.85 0.9 inefficiency diff

-0.0002 0 0.0002

0.0004

0.0006

0.0008

0.001 Data MC fiducial projection θ (DS-US) Inefficiency diffs, cos