p (MeV/c)

10 15 20 25 30 35 40 45 50 θ cos

0.4

0.5

0.6

0.7

0.8

0.9

1

-0.0015

-0.001

-0.0005

0

0.0005

0.001

0.0015

(DS-US) Difference in Inefficiency, Data