0 10 20 30 40 50

0.73

0.735

0.74

0.745

0.75

0.755

0.76

Mean 30.09

0 10 20 30 40 50

0.74

0.742

0.744

0.746

0.748

0.75

0.752

0.754

0.756

0.758

0.76

Mean 29.34

0 10 20 30 40 50

0.71

0.715

0.72

0.725

0.73

0.735

0.74

Mean 30.09

0 10 20 30 40 50

0.72

0.725

0.73

0.735

0.74

0.745

0.75

Mean 29.34

0 10 20 30 40 50

0.012

0.013

0.014

0.015

0.016

0.017

0.018

0.019

Mean 30.14

0 10 20 30 40 50

0.006

0.007

0.008

0.009

0.01

0.011

0.012

0.013

0.014

0.015

Mean 29.59