x, Reduced Energy

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

Michel Spectrum

-0.05

0

0.05

0.1

0.15

Difference for drho at world limit

-0.0001 0 0.0001

0.0002

0.0003

0.0004

0.0005

0.0006

Difference for deta at world limit