Decay time (ns)

0 1000 2000 3000 4000 5000 6000 7000 8000 9000 10000

Count

0

500

1000

1500

2000

2500 310 × Data, simple events sμ 0.000393 ± = 2.197759

Data τ

Decay time (ns)

0 1000 2000 3000 4000 5000 6000 7000 8000 9000 10000

Count

0

500

1000

1500

2000

2500

3000 310 × MC, simple events sμ 0.000362 ± = 2.197052 MCτ