300 400 500 600 700 800 900 1000 1100 30 31 32 33 34 35 36 37 Degrees of freedom for 0.50<|cos(theta)|<0.55

300 400 500 600 700 800 900 1000 1100 21

22

23

24

25

26

27 Degrees of freedom for 0.75<|cos(theta)|<0.80

300 400 500 600 700 800 900 1000 1100 30

31

32

33

34

35

36 Degrees of freedom for -0.55<|cos(theta)|<-0.50

300 400 500 600 700 800 900 1000 1100 20 21 22 23 24 25 26 27 Degrees of freedom for -0.80<|cos(theta)|<-0.75

300 400 500 600 700 800 900 1000 1100 27 27.5 28 28.5 29 29.5 30 30.5 31 31.5 32 Degrees of freedom