(MeV/c) tot US P

15 20 25 30 35 40 45 50

) (MeV/c) θ )(US cos tot PΔ(

-0.3

-0.2

-0.1

0

0.1

0.2

, data tot ) vs US P θ )(US cos tot PΔ(

Data Geant