(MeV/c) tot (DS - US) P

-2 -1.5 -1 -0.5 0 0.5 1 1.5 2 0

0.01

0.02

0.03

0.04

0.05

0.06

, Data (MeV/c) tot PΔ

(DS-US)

, MC (MeV/c) tot PΔ

(DS-US)

Entries (unscaled) 4976 39277

Normalized Overlay

, Graphite/Mylar Target tot PΔ