nominal_A nominal_B low_field high_field 1850v_dc_hv 1900v_dc_hv cloud low_rate high_rate

-0.02

-0.018

-0.016

-0.014

-0.012

-0.01

-0.008

-0.006

-0.004

-0.002 -0 Rho fits for data