(radians) θ (DS - US)

-0.05 -0.04 -0.03 -0.02 -0.01 0 0.01 0.02 0.03 0.04 0.05 θ

0.005

0.01

0.015

0.02

0.025

0.03

0.035

, Data θΔ (DS-US) , MC θΔ (DS-US)

Entries (unscaled) 4860 38083

Normalized Overlay

, Graphite/Mylar Target θΔ