Total PC5 width (ns)

0 50 100 150 200 250 300 350 400 450 500

Total PC6 width(ns)

0 50 100 150 200 250 300 350 400 450 500

0

10000

20000

30000

40000

50000

60000

Pulse widths before cut: 1 in PC5, 1 in PC6

Nominal data