H23205

Entries 4.667165e+08 Mean 1.631 RMS 2.07

/ndof 2χ 0 1 2 3 4 5 6 7 8 9 10 tracks

0

10

20

30

40

50

60 610 ×

H23205

Entries 3.245712e+08 Mean 1.457 RMS 1.978

HelixFit fit ChiSqr/DOF

data

simulation

data: s74a1

sim: g501a1