z (cm)

-0.15 -0.10 -0.05 -0.00 0.05 0.10 0.15 0.20

u or v (cm)

-0.20

-0.15

-0.10

-0.05

-0.00

0.05

0.10

0.15

0.20

wire refined STRs

simulation refined

10 ns

35 ns 60 ns