distance from wire (cm)

0.00 0.05 0.10 0.15 0.20 m) μ (σ resolution,

50

100

150

200

250

300

mμ = 100 σ old function, new function,

)]^2 x^{-2} m [sinh(100 cm μ m + 5 μ = 120 σ