θ 1/cos

1 1.2 1.4 1.6 1.8 2 2.2 momentum (MeV/c)

52.70

52.72

52.74

52.76

52.78

52.80

52.82

52.84

52.86

52.88

52.90

data (s84a5)

simulation (g501a1_2)

downstream