H01921_px Entries 400297 Mean 0.2414 RMS 0.6085

x (cm)

-10 -5 0 5 10 number of muons

0 20 40 60 80 100 120 140 310 × Beam spot upstream averaged wire hit xy positions at DC Plane Pair 1

Profile (x) of muon beam at DC1/DC2