z (cm)

-300 -200 -100 0 100

(T) zB

0.0 0.2 0.4 0.6 0.8 1.0 1.2 1.4 1.6 1.8 2.0 2.2 (x,y) = (0,0) cm

(x,y) = (0,10) cm

-60 -40 -20 0 20 40 60

1.995

2.000

2.005

2.010

2.015

Tracking region: -50 cm < z < +50 cm