x (cm)

-4 -3 -2 -1 0 1 2 3 4 5

(rad) xθ

-0.25

-0.20

-0.15

-0.10

-0.05

0.00

0.05

0.10

0.15

0.20

0.25

H61512

Entries 639928 Mean x 0.0005567 ± 0.186 Mean y 1.777e-05 ± 0.0003261 RMS x 0.4453 RMS y 0.01422 Integral 6.399e+05 0 0 0 0 639928 0 0 0 0

0 1000

2000

3000

4000

5000

6000

± ±

TEC A1X vs X at z=-191.944cm xθ

correlation between x and s75 (nominal, 2006)

y (cm)

-4 -3 -2 -1 0 1 2 3 4 5

(rad) yθ

-0.25

-0.20

-0.15

-0.10

-0.05

0.00

0.05

0.10

0.15

0.20

0.25

H61513

Entries 639928 Mean x 0.0007671 ± -0.03688 Mean y 2.657e-05 ± 0.003997 RMS x 0.6136 RMS y 0.02126 Integral 6.399e+05 0 0 0 0 639928 0 0 0 0

0 1000

2000

3000

4000

5000

6000

± ±

TEC A1Y vs Y at z=-191.944cm yθ

correlation between y and

s75 (nominal, 2006)