4350043600437004380043900440004410044200 accumulated scaler / T1Ion

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2_{FBTR/T1Ion}

M/T1Ion DS/T1Ion PU/T1Ion