z (cm)

-300 -250 -200 -150 -100 -50 0 50 100 150

(T) z longitudinal field, B

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 2.2_{r = 0 cm}

r = 15.0 cm r = 30.0 cm

z (cm)

-40 -20 0 20 40

(T) zB

1.99

1.995 2 2.005

2.01

Longitudinal field components from OPERA-3D

TEC yoke

Tracking region -50 cm < z < 50 cm