histo_t0s_US Entries 1760 Mean 0.3686 RMS 0.2662

wire time offset (ns)

-2.0 -1.5 -1.0 -0.5 0.0 0.5 1.0 1.5 2.0 wires

20 40 60 80 100 120 140 160 180 200

histo_t0s_DS Entries 1760 Mean 0.4141 RMS 0.2398

upstream

downstream

histo_t0s_US