z (cm)

-300 -250 -200 -150 -100 -50 0 50 100 150

(T) trans

transverse field, B

0 0.02

0.04

0.06

0.08 0.1 0.12

0.14

0.16

0.18 0.2 r = 0 cm r = 5 cm r = 10 cm

z (cm)

-40 -20 0 20 40

(T) trans B

0 0.0002

0.0004

0.0006

0.0008

0.001

0.0012

0.0014

0.0016

0.0018

0.002

Tracking region -50cm < z < 50cm

Transverse field components from OPERA-3D

TEC yoke

z (cm)