x 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 relative rate

0

0.5

1

1.5

2 = 0.65 δ = 0.75 δ = 0.85 δ delta_0.65_cos_theta_-1.0

= -1 θ cos

= 0 θ cos

= +1 θ cos