ξ_μP

0.99 0.995 1 1.005 1.01 x to maximise rate

0.655

0.656

0.657

0.658

0.659

0.66

0.661

0.662

0.663

0.664

0.665

= -1.0 θ cos

ξ_μP

0.99 0.995 1 1.005 1.01 x to maximise rate

0.76

0.761

0.762

0.763

0.764

0.765

0.766

0.767

0.768

0.769

0.77

= -0.5 θ cos